IMAGE magnetometer network 1995-09-27

14 16 18 20 22 00 Hour (UT)

Z-COMPONENT^{2000 nT}

1 minute averages

NAL

LYR

HOR

BJN

SOR

MAS

MUO

PEL

OUJ

HAN

NUR