IMAGE magnetometer network 1996-10-19

13 15 17 19 21 23 Hour (UT)

X-COMPONENT^{2000 nT}

1 minute averages

NAL

LYR

HOR

BJN

SOR

MAS

MUO

PEL

OUJ

HAN

NUR